50 100 150 200 250 300 350 400 450 500 -10 -5 0 5 Analyzed Signal (length = 520)

50 100 150 200 250 300 350 400 450 500 -10 0 10 Coefficients Line - Ca,b for scale a = 128 (frequency = 0.005)

50 100 150 200 250 300 350 400 450 500

1 14

27 40

53 66

79 92

105118

131144

157170

183196

209222

235248

Local Maxima Lines

Scale of colors from MIN to MAX

Ca,b Coefficients - Coloration mode : init + by scale + abs

1 14

27 40

53 66

79 92

105118

131144

157170

183196

209222

235248